878

872

875

963

944

929

956

923 922

936

926

934

925 927

950

942

930

926

925

921 909 903

908

916 921 923

928

924 922

921 922

908 897 898

912 918 910 916

914 917

906 897

896

891

902 907 908 910

906

886

878 880 887 888 895 901

902

900

882

881

885

883 886 894

895

894 898

955 932 932

941 240213/1200 300-mb Height (dam) and wind (kt) - contour every 9 dam