895

877

869

965

964

958

953

963

957

947 943

952

942

946

934 930

956

951

944

936

934

925

950 943 938

929

920 913 919

936

928 928

923 916

940 935 918

902 909 900 921

914 911

930 921

922

912

900 909 918 916

911

899

884 885 896 902 909 910

912

909

902

889

901

899 902 900

919

892 897

908

963 943 941

954 949 230217/1200 300-mb Height (dam) and wind (kt) - contour every 9 dam