863

919

909 902

884

957

953

952

947

953

953

951 952

956

951

954

946 943

958

956

950

940

937

939

943 943 942

943

934 934 928

938

925 928

927 936

935 937 939

934 914 919 888 897

916 927

925 923

936

929

908 889 899

905

932

925 920 907 883 875 875

880

892

902

899

878

873 867 867

913

925

916

932

925

951 949 948

956

170307/0000 300-mb Height (dam) and wind (kt) - contour every 9 dam