872

848

869

965

964

949

957

946

924 915

936

917

934

916 922

956

948

941

931

937

937

938 939 915

893

900 915 924

936

931 936

936 937

923 914 887

893 914 898 922 930

934 936

901

896

886

894 908 930 932

930

868

855 858 875 891 909 921

928

924

889

866

894

903 912 915

904

871 873

958 947 949

954 960 220312/1200 300-mb height (dam), wind (kt) - contour height every 9 dam, and wind every 20 kt., starting at 70 kt.