70

90

110

130

150

100206/0000V000 300 MB KNTMAGWND

864

873

873 882 882 891 891

900 900

900 909

909

918 927

936

945 963 963

100206/0000V000 300 MB HGHT (*10**-1) 100206/0000V000 300 MB KNTV(WND)