-1

0

1

2

3

4

5

6

7

8

9

10

850-mb Temp (c), Height (dam), wind (kt), Fgen 180302/0000F015

0

1

2

3

4

5

6

7

8

9

-10

-10

-8

-6 -4

-4

-4 -4

-4

-2 0

2 2 4

4

6 8

10

12

12

117 117

120 123

126 129 132 135 138

141

144 147