10

20

30

40

50

60

70

80

90

12Z Day 1 - 700-mb RH, Temp (C), Height (dam), and Wind (kt.)

-18

-15 -12 -12 -9

-9

-9

-9 -6

-6 -6 -3

-3

0

0

0

3

3

6

9

12

285

288 288

288

291

291

294

294

297

297

300

300

303

303

306 309

312

315