-15

-12

-9

-6

-3

0

3

6

9

12

15

18

21

12Z Day 1- 850-mb Temp (C), Height (dam), and Wind (kt.)

0

3

6

9

135

135

135

138

138 138

141

141

141

141

144

144

147

147

150 150

153

156