Data Type:                         
Project ID:                        
Launch Site Type/Site ID:          Descending
Launch Location (lon,lat,alt):     0 01.20'E, 0 00.00'N, 0.02000 0.00000 -999
GMT Launch Time (y,m,d,h,m,s):     2014, 10, 15, 21:17:60
Sonde Id:                          
/
/
/
System Operator/Comments:          ,unknown
Post Processing Comments:          Aspen Version 3.1-7635M; Created on 25 Feb 2015 20:24 UTC
/
 Time  Press  Temp  Dewpt  RH    Uwind  Vwind  Wspd  Dir   dZ      Lon     Lat    Rng   Az     Alt    Qp   Qt   Qh   Qu   Qv   Quv
  sec    mb     C     C     %     m/s    m/s   m/s   deg   m/s     deg     deg     km   deg     m     mb   C    %    m/s  m/s  m/s
------ ------ ----- ----- ----- ------ ------ ----- ----- ----- -------- ------- ----- ----- ------- ---- ---- ---- ---- ---- ----
 321.0 9999.0 -14.9 -20.6  62.4  -25.4  -10.0  27.3  68.6  99.0    0.310 264.790 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
 320.8 9999.0 -15.0 -20.7  62.2  -25.6  -10.1  27.5  68.4  99.0    0.310 282.870 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
 300.5  362.7 -17.2 -25.0  51.2  -27.0   -7.2  27.9  75.0 -25.4    0.330 282.870 999.0 999.0     0.0 99.0 99.0 99.0 99.0 99.0 99.0
 295.5  356.6 -18.2 -26.5  48.9  -26.8   -6.0  27.4  77.5 -25.7    0.330 282.870 999.0 999.0   127.7 99.0 99.0 99.0 99.0 99.0 99.0
 270.5  326.0 -23.6 -34.4  37.5  999.0  999.0 999.0 999.0 -27.3    0.330 282.870 999.0 999.0   789.6 99.0 99.0 99.0 99.0 99.0 99.0
 269.8  325.1 -23.7 -34.6  37.1  999.0  999.0 999.0 999.0 -27.3    0.330 282.870 999.0 999.0   810.9 99.0 99.0 99.0 99.0 99.0 99.0
 260.5  314.2 -25.6 -37.6  32.8  999.0  999.0 999.0 999.0 -25.8    0.330 282.870 999.0 999.0  1058.6 99.0 99.0 99.0 99.0 99.0 99.0
 255.0  308.1 -26.5 -39.4  29.9  -23.7  -12.3  26.8  62.6 -28.2    0.330 282.870 999.0 999.0  1200.9 99.0 99.0 99.0 99.0 99.0 99.0
 251.5  303.6 -27.2 -40.7  27.7  999.0  999.0 999.0 999.0 -29.3    0.330 282.870 999.0 999.0  1305.8 99.0 99.0 99.0 99.0 99.0 99.0
 246.5  297.7 -28.1 -42.6  25.0  -21.8  -13.4  25.6  58.4 -27.4    0.330 282.870 999.0 999.0  1446.0 99.0 99.0 99.0 99.0 99.0 99.0
 233.0  282.8 -30.8 -47.8  18.5  -20.7  -15.3  25.8  53.6 -29.2    0.330 282.870 999.0 999.0  1814.5 99.0 99.0 99.0 99.0 99.0 99.0
 227.5  276.2 -32.0 -50.4  15.7  -20.4  -15.2  25.4  53.3 -30.3    0.330 299.140 999.0 999.0  1981.2 99.0 99.0 99.0 99.0 99.0 99.0
 226.0  274.5 -32.4 -51.1  15.0  -20.2  -15.1  25.2  53.2 -30.5    0.330 299.140 999.0 999.0  2025.2 99.0 99.0 99.0 99.0 99.0 99.0
 224.5  272.7 -32.7 -51.8  14.3  999.0  999.0 999.0 999.0 -30.5    0.330 299.140 999.0 999.0  2071.4 99.0 99.0 99.0 99.0 99.0 99.0
 221.5  269.1 -33.4 -53.3  12.9  -19.7  -15.1  24.8  52.4 -29.8    0.330 299.140 999.0 999.0  2163.3 99.0 99.0 99.0 99.0 99.0 99.0
 218.5  265.8 -34.0 -54.8  11.6  -19.3  -15.2  24.6  51.7 -28.4    0.330 299.140 999.0 999.0  2250.4 99.0 99.0 99.0 99.0 99.0 99.0
 215.3  262.4 -34.7 -56.4  10.3  -19.1  -15.1  24.4  51.6 -28.6    0.330 299.140 999.0 999.0  2340.8 99.0 99.0 99.0 99.0 99.0 99.0
 210.0  256.6 -36.0 -59.2   8.4  -19.0  -14.2  23.7  53.1 -30.6    0.330 299.140 999.0 999.0  2496.9 99.0 99.0 99.0 99.0 99.0 99.0
 209.8  256.3 -36.0 -59.3   8.3  -19.0  -14.2  23.7  53.2 -30.7    0.330 299.140 999.0 999.0  2504.8 99.0 99.0 99.0 99.0 99.0 99.0
 207.5  253.7 -36.6 -60.6   7.5  -18.8  -13.7  23.3  54.0 -30.2    0.330 312.560 999.0 999.0  2575.1 99.0 99.0 99.0 99.0 99.0 99.0
 197.0  242.7 -39.1 -66.0   5.0  -18.1  -12.2  21.9  56.0 -31.0    0.330 312.560 999.0 999.0  2881.0 99.0 99.0 99.0 99.0 99.0 99.0
 194.0  239.3 -40.0 -67.4   4.5  999.0  999.0 999.0 999.0 -33.3    0.330 312.560 999.0 999.0  2976.2 99.0 99.0 99.0 99.0 99.0 99.0
 192.0  236.9 -40.8 -68.5   4.3  999.0  999.0 999.0 999.0 -33.4    0.330 312.560 999.0 999.0  3046.0 99.0 99.0 99.0 99.0 99.0 99.0
 191.8  236.6 -40.9 -68.6   4.3  999.0  999.0 999.0 999.0 -33.2    0.320 312.560 999.0 999.0  3054.7 99.0 99.0 99.0 99.0 99.0 99.0
 190.8  235.4 -41.3 -69.1   4.2  999.0  999.0 999.0 999.0 -32.0    0.320 312.560 999.0 999.0  3088.2 99.0 99.0 99.0 99.0 99.0 99.0
 186.0  230.5 -42.4 -71.3   3.5  -14.1   -9.0  16.7  57.2 -31.3    0.320 312.560 999.0 999.0  3230.4 99.0 99.0 99.0 99.0 99.0 99.0
 184.5  228.8 -42.4 -72.0   3.2  999.0  999.0 999.0 999.0 -32.3    0.320 312.560 999.0 999.0  3280.0 99.0 99.0 99.0 99.0 99.0 99.0
 182.5  226.6 -42.4 -72.9   2.8   -9.4   -8.1  12.4  49.3 -32.2    0.310 312.560 999.0 999.0  3346.6 99.0 99.0 99.0 99.0 99.0 99.0
 178.5  222.4 -42.3 -74.2   2.3  999.0  999.0 999.0 999.0 -30.7    0.310 312.560 999.0 999.0  3471.2 99.0 99.0 99.0 99.0 99.0 99.0
 175.0  218.9 -42.6 -75.2   2.1   -7.0   -5.2   8.8  53.3 -31.8    0.310 312.560 999.0 999.0  3578.4 99.0 99.0 99.0 99.0 99.0 99.0
 174.5  218.4 -42.7 -75.3   2.1   -7.0   -5.0   8.6  54.7 -32.2    0.310 312.560 999.0 999.0  3594.8 99.0 99.0 99.0 99.0 99.0 99.0
 171.5  215.2 -43.2 -76.2   1.9  999.0  999.0 999.0 999.0 -33.8    0.310 312.560 999.0 999.0  3694.7 99.0 99.0 99.0 99.0 99.0 99.0
 170.0  213.6 -43.5 -76.6   1.9  999.0  999.0 999.0 999.0 -33.9    0.310 312.560 999.0 999.0  3745.5 99.0 99.0 99.0 99.0 99.0 99.0
 169.0  212.5 -43.7 -76.9   1.9  999.0  999.0 999.0 999.0 -33.7    0.310 312.560 999.0 999.0  3779.4 99.0 99.0 99.0 99.0 99.0 99.0
 168.8  212.2 -43.8 -77.0   1.8  999.0  999.0 999.0 999.0 -33.6    0.310 318.840 999.0 999.0  3787.9 99.0 99.0 99.0 99.0 99.0 99.0
 167.8  211.2 -44.1 -77.2   1.8   -7.4   -3.0   8.0  68.3 -33.3    0.300 318.840 999.0 999.0  3821.5 99.0 99.0 99.0 99.0 99.0 99.0
 166.3  209.6 -44.5 -77.6   1.8  999.0  999.0 999.0 999.0 -32.9    0.300 318.840 999.0 999.0  3870.7 99.0 99.0 99.0 99.0 99.0 99.0
 158.0  201.2 -46.9 -78.6   2.0  999.0  999.0 999.0 999.0 -34.9    0.300 318.840 999.0 999.0  4143.7 99.0 99.0 99.0 99.0 99.0 99.0
 157.0  200.1 -47.2 -78.8   2.0  999.0  999.0 999.0 999.0 -35.1    0.300 318.840 999.0 999.0  4180.7 99.0 99.0 99.0 99.0 99.0 99.0
 156.0  199.0 -47.5 -78.9   2.1   -6.5   -2.2   6.8  71.2 -34.9    0.300 318.840 999.0 999.0  4216.6 99.0 99.0 99.0 99.0 99.0 99.0
 155.8  198.7 -47.6 -78.9   2.1   -6.4   -2.2   6.8  71.1 -34.9    0.300 318.840 999.0 999.0  4225.3 99.0 99.0 99.0 99.0 99.0 99.0
 154.0  197.0 -48.0 -79.2   2.1  999.0  999.0 999.0 999.0 -35.0    0.300 318.840 999.0 999.0  4284.9 99.0 99.0 99.0 99.0 99.0 99.0
 153.0  195.9 -48.3 -79.4   2.1   -6.0   -1.9   6.3  72.5 -35.2    0.300 318.840 999.0 999.0  4319.4 99.0 99.0 99.0 99.0 99.0 99.0
 152.0  194.9 -48.6 -79.5   2.1  999.0  999.0 999.0 999.0 -35.3    0.300 321.510 999.0 999.0  4354.7 99.0 99.0 99.0 99.0 99.0 99.0
 150.0  192.7 -49.2 -79.8   2.2   -6.1   -1.2   6.3  79.3 -35.0    0.290 321.510 999.0 999.0  4427.0 99.0 99.0 99.0 99.0 99.0 99.0
 149.8  192.5 -49.2 -79.8   2.2   -6.2   -1.1   6.3  79.8 -34.8    0.290 321.510 999.0 999.0  4435.9 99.0 99.0 99.0 99.0 99.0 99.0
 148.0  190.7 -49.7 -80.0   2.3  999.0  999.0 999.0 999.0 -33.5    0.290 321.510 999.0 999.0  4495.1 99.0 99.0 99.0 99.0 99.0 99.0
 144.0  186.9 -50.9 -80.5   2.4   -5.8   -0.9   5.9  81.0 -35.1    0.290 321.510 999.0 999.0  4628.2 99.0 99.0 99.0 99.0 99.0 99.0
 143.0  185.9 -51.2 -80.8   2.3   -5.7   -1.1   5.8  78.7 -36.3    0.270 321.510 999.0 999.0  4664.2 99.0 99.0 99.0 99.0 99.0 99.0
 142.0  184.8 -51.5 -81.1   2.3  999.0  999.0 999.0 999.0 -37.2    0.270 321.510 999.0 999.0  4701.3 99.0 99.0 99.0 99.0 99.0 99.0
 140.0  182.6 -52.2 -81.6   2.3  999.0  999.0 999.0 999.0 -37.8    0.270 321.510 999.0 999.0  4777.7 99.0 99.0 99.0 99.0 99.0 99.0
 139.8  182.4 -52.3 -81.7   2.3  999.0  999.0 999.0 999.0 -37.7    0.270 321.510 999.0 999.0  4787.3 99.0 99.0 99.0 99.0 99.0 99.0
 138.0  180.5 -52.8 -81.9   2.4   -4.9   -3.4   6.0  54.9 -36.4    0.270 321.510 999.0 999.0  4852.2 99.0 99.0 99.0 99.0 99.0 99.0
 137.8  180.3 -52.9 -82.0   2.4   -4.8   -3.6   6.0  53.4 -36.3    0.270 321.510 999.0 999.0  4861.2 99.0 99.0 99.0 99.0 99.0 99.0
 136.8  179.3 -53.2 -82.1   2.4   -4.4   -4.0   6.0  47.8 -35.8    0.270 320.210 999.0 999.0  4896.7 99.0 99.0 99.0 99.0 99.0 99.0
 135.0  177.6 -53.6 -82.1   2.5   -3.8   -4.5   5.9  39.9 -35.6    0.260 320.210 999.0 999.0  4958.2 99.0 99.0 99.0 99.0 99.0 99.0
 134.8  177.3 -53.7 -82.1   2.5   -3.7   -4.6   5.9  38.9 -35.7    0.260 320.210 999.0 999.0  4967.0 99.0 99.0 99.0 99.0 99.0 99.0
 133.8  176.4 -54.0 -82.1   2.6   -3.5   -4.8   6.0  35.7 -36.1    0.260 320.210 999.0 999.0  5002.8 99.0 99.0 99.0 99.0 99.0 99.0
 131.5  174.1 -54.6 -82.1   2.8   -3.3   -5.3   6.3  32.2 -35.2    0.260 320.210 999.0 999.0  5084.9 99.0 99.0 99.0 99.0 99.0 99.0
 130.8  173.4 -54.8 -82.1   2.9   -3.4   -5.5   6.4  32.2 -34.4    0.260 320.210 999.0 999.0  5111.6 99.0 99.0 99.0 99.0 99.0 99.0
 129.8  172.5 -55.0 -82.2   2.9   -3.6   -5.6   6.7  32.9 -33.5    0.260 320.210 999.0 999.0  5145.9 99.0 99.0 99.0 99.0 99.0 99.0
 128.3  171.2 -55.4 -82.2   3.0  999.0  999.0 999.0 999.0 -32.3    0.260 316.860 999.0 999.0  5193.8 99.0 99.0 99.0 99.0 99.0 99.0
 127.8  170.8 -55.5 -82.3   3.1  999.0  999.0 999.0 999.0 -32.2    0.250 316.860 999.0 999.0  5209.2 99.0 99.0 99.0 99.0 99.0 99.0
 126.0  169.3 -56.1 -82.4   3.2   -4.5   -6.0   7.5  37.3 -33.1    0.250 316.860 999.0 999.0  5265.4 99.0 99.0 99.0 99.0 99.0 99.0
 125.0  168.3 -56.4 -82.5   3.3  999.0  999.0 999.0 999.0 -33.7    0.250 316.860 999.0 999.0  5300.1 99.0 99.0 99.0 99.0 99.0 99.0
 124.3  167.6 -56.7 -82.6   3.3  999.0  999.0 999.0 999.0 -34.1    0.250 316.860 999.0 999.0  5326.3 99.0 99.0 99.0 99.0 99.0 99.0
 123.8  167.2 -56.9 -82.6   3.4   -4.8   -6.2   7.8  37.6 -34.3    0.250 316.860 999.0 999.0  5343.5 99.0 99.0 99.0 99.0 99.0 99.0
 122.0  165.6 -57.5 -82.8   3.5   -4.9   -6.5   8.1  37.2 -35.4    0.250 316.860 999.0 999.0  5403.2 99.0 99.0 99.0 99.0 99.0 99.0
 121.0  164.7 -57.8 -82.9   3.6   -5.0   -6.6   8.3  37.4 -36.1    0.250 316.860 999.0 999.0  5439.0 99.0 99.0 99.0 99.0 99.0 99.0
 120.3  164.0 -58.1 -83.0   3.7  999.0  999.0 999.0 999.0 -36.4    0.250 311.420 999.0 999.0  5466.6 99.0 99.0 99.0 99.0 99.0 99.0
 119.5  163.2 -58.3 -83.1   3.7  999.0  999.0 999.0 999.0 -36.5    0.230 311.420 999.0 999.0  5494.5 99.0 99.0 99.0 99.0 99.0 99.0
 118.0  161.8 -58.7 -83.4   3.7   -5.6   -6.6   8.6  40.1 -36.5    0.230 311.420 999.0 999.0  5549.5 99.0 99.0 99.0 99.0 99.0 99.0
 117.8  161.6 -58.8 -83.5   3.7   -5.6   -6.6   8.6  40.4 -36.5    0.230 311.420 999.0 999.0  5558.5 99.0 99.0 99.0 99.0 99.0 99.0
 116.0  160.0 -59.3 -83.8   3.7   -5.8   -6.2   8.5  43.3 -36.2    0.230 311.420 999.0 999.0  5621.6 99.0 99.0 99.0 99.0 99.0 99.0
 115.8  159.7 -59.3 -83.9   3.7   -5.9   -6.1   8.5  43.8 -36.2    0.230 311.420 999.0 999.0  5630.6 99.0 99.0 99.0 99.0 99.0 99.0
 114.0  158.1 -59.9 -84.0   3.9   -6.1   -5.5   8.2  47.7 -36.5    0.230 311.420 999.0 999.0  5693.9 99.0 99.0 99.0 99.0 99.0 99.0
 113.8  157.9 -59.9 -84.0   3.9   -6.1   -5.4   8.2  48.2 -36.6    0.230 311.420 999.0 999.0  5703.0 99.0 99.0 99.0 99.0 99.0 99.0
 112.8  157.0 -60.2 -84.0   4.1   -6.2   -5.2   8.0  50.1 -36.7    0.230 303.860 999.0 999.0  5739.3 99.0 99.0 99.0 99.0 99.0 99.0
 111.0  155.4 -60.8 -84.0   4.4   -6.2   -4.9   7.9  51.4 -36.1    0.220 303.860 999.0 999.0  5803.7 99.0 99.0 99.0 99.0 99.0 99.0
 110.8  155.1 -60.9 -84.0   4.5   -6.2   -4.9   7.9  51.3 -35.9    0.220 303.860 999.0 999.0  5812.9 99.0 99.0 99.0 99.0 99.0 99.0
 109.8  154.2 -61.2 -84.0   4.6  999.0  999.0 999.0 999.0 -34.7    0.220 303.860 999.0 999.0  5849.3 99.0 99.0 99.0 99.0 99.0 99.0
 108.8  153.4 -61.5 -84.0   4.8  999.0  999.0 999.0 999.0 -33.1    0.220 303.860 999.0 999.0  5883.8 99.0 99.0 99.0 99.0 99.0 99.0
 107.3  152.2 -62.0 -84.2   4.9  999.0  999.0 999.0 999.0 -31.6    0.220 303.860 999.0 999.0  5931.7 99.0 99.0 99.0 99.0 99.0 99.0
 106.8  151.8 -62.1 -84.3   4.9  999.0  999.0 999.0 999.0 -31.5    0.220 303.860 999.0 999.0  5946.8 99.0 99.0 99.0 99.0 99.0 99.0
 105.0  150.5 -62.6 -84.6   5.0  999.0  999.0 999.0 999.0 -33.2    0.220 303.860 999.0 999.0  5999.6 99.0 99.0 99.0 99.0 99.0 99.0
 104.0  149.7 -62.9 -84.8   5.0   -5.2   -4.9   7.1  46.4 -35.9    0.220 294.170 999.0 999.0  6033.7 99.0 99.0 99.0 99.0 99.0 99.0
 103.0  148.7 -63.2 -85.1   5.0  999.0  999.0 999.0 999.0 -38.3    0.210 294.170 999.0 999.0  6072.4 99.0 99.0 99.0 99.0 99.0 99.0
 102.0  147.8 -63.5 -85.3   5.0  999.0  999.0 999.0 999.0 -39.7    0.210 294.170 999.0 999.0  6113.3 99.0 99.0 99.0 99.0 99.0 99.0
 101.8  147.5 -63.6 -85.4   5.0  999.0  999.0 999.0 999.0 -39.8    0.210 294.170 999.0 999.0  6123.5 99.0 99.0 99.0 99.0 99.0 99.0
 100.8  146.5 -63.9 -85.6   5.0   -4.6   -4.9   6.7  43.3 -40.1    0.210 294.170 999.0 999.0  6163.9 99.0 99.0 99.0 99.0 99.0 99.0
  99.0  144.9 -64.4 -85.6   5.3   -4.5   -5.1   6.8  41.5 -38.7    0.210 294.170 999.0 999.0  6232.5 99.0 99.0 99.0 99.0 99.0 99.0
  98.8  144.7 -64.5 -85.6   5.4  999.0  999.0 999.0 999.0 -38.3    0.210 294.170 999.0 999.0  6242.2 99.0 99.0 99.0 99.0 99.0 99.0
  97.8  143.8 -64.7 -85.5   5.6   -4.5   -5.2   6.9  40.4 -37.0    0.210 294.170 999.0 999.0  6280.1 99.0 99.0 99.0 99.0 99.0 99.0
  96.8  142.9 -65.0 -85.5   5.8   -4.4   -5.3   6.9  39.7 -35.6    0.210 282.360 999.0 999.0  6316.6 99.0 99.0 99.0 99.0 99.0 99.0
  95.0  141.5 -65.4 -85.6   6.1  999.0  999.0 999.0 999.0 -34.1    0.190 282.360 999.0 999.0  6376.6 99.0 99.0 99.0 99.0 99.0 99.0
  94.8  141.3 -65.5 -85.6   6.1   -4.3   -5.4   6.9  38.4 -34.0    0.190 282.360 999.0 999.0  6385.0 99.0 99.0 99.0 99.0 99.0 99.0
  93.8  140.6 -65.8 -85.8   6.1   -4.2   -5.5   6.9  37.7 -34.2    0.190 282.360 999.0 999.0  6418.4 99.0 99.0 99.0 99.0 99.0 99.0
  92.3  139.4 -66.2 -86.2   6.1  999.0  999.0 999.0 999.0 -35.4    0.190 282.360 999.0 999.0  6469.8 99.0 99.0 99.0 99.0 99.0 99.0
  91.0  138.3 -66.6 -86.5   6.1   -4.2   -5.6   7.0  37.0 -36.9    0.190 282.360 999.0 999.0  6515.3 99.0 99.0 99.0 99.0 99.0 99.0
  90.8  138.1 -66.7 -86.6   6.1   -4.2   -5.6   7.0  37.1 -37.2    0.190 282.360 999.0 999.0  6524.7 99.0 99.0 99.0 99.0 99.0 99.0
  89.0  136.6 -67.2 -86.9   6.2  999.0  999.0 999.0 999.0 -38.1    0.190 282.360 999.0 999.0  6591.9 99.0 99.0 99.0 99.0 99.0 99.0
  88.8  136.4 -67.3 -86.9   6.3  999.0  999.0 999.0 999.0 -38.2    0.190 268.440 999.0 999.0  6601.6 99.0 99.0 99.0 99.0 99.0 99.0
  87.8  135.5 -67.7 -87.1   6.4   -4.4   -5.2   6.8  39.9 -38.1    0.180 268.440 999.0 999.0  6640.2 99.0 99.0 99.0 99.0 99.0 99.0
  86.0  134.0 -68.2 -87.3   6.6   -4.3   -4.9   6.5  40.9 -37.4    0.180 268.440 999.0 999.0  6706.1 99.0 99.0 99.0 99.0 99.0 99.0
  85.8  133.8 -68.3 -87.3   6.7   -4.3   -4.9   6.5  40.9 -37.4    0.180 268.440 999.0 999.0  6715.3 99.0 99.0 99.0 99.0 99.0 99.0
  84.0  132.4 -68.8 -87.5   6.9  999.0  999.0 999.0 999.0 -38.4    0.180 268.440 999.0 999.0  6779.7 99.0 99.0 99.0 99.0 99.0 99.0
  83.8  132.2 -68.9 -87.6   6.9  999.0  999.0 999.0 999.0 -38.6    0.180 268.440 999.0 999.0  6789.0 99.0 99.0 99.0 99.0 99.0 99.0
  82.0  130.7 -69.5 -87.8   7.1   -4.1   -4.7   6.2  41.4 -39.9    0.180 268.440 999.0 999.0  6857.1 99.0 99.0 99.0 99.0 99.0 99.0
  81.0  129.7 -69.8 -88.0   7.3  999.0  999.0 999.0 999.0 -40.1    0.180 268.440 999.0 999.0  6899.3 99.0 99.0 99.0 99.0 99.0 99.0
  80.8  129.5 -69.9 -88.1   7.3  999.0  999.0 999.0 999.0 -40.0    0.180 252.450 999.0 999.0  6910.0 99.0 99.0 99.0 99.0 99.0 99.0
  79.8  128.6 -70.2 -88.2   7.4  999.0  999.0 999.0 999.0 -39.0    0.160 252.450 999.0 999.0  6951.7 99.0 99.0 99.0 99.0 99.0 99.0
  78.8  127.8 -70.5 -88.3   7.5  999.0  999.0 999.0 999.0 -37.5    0.160 252.450 999.0 999.0  6989.3 99.0 99.0 99.0 99.0 99.0 99.0
  77.0  126.5 -71.0 -88.6   7.8  999.0  999.0 999.0 999.0 -37.6    0.160 252.450 999.0 999.0  7050.3 99.0 99.0 99.0 99.0 99.0 99.0
  76.0  125.7 -71.3 -88.8   7.9   -4.4   -4.5   6.3  43.9 -38.8    0.160 252.450 999.0 999.0  7088.4 99.0 99.0 99.0 99.0 99.0 99.0
  75.0  124.8 -71.7 -89.0   8.0  999.0  999.0 999.0 999.0 -39.8    0.160 252.450 999.0 999.0  7129.1 99.0 99.0 99.0 99.0 99.0 99.0
  74.8  124.6 -71.8 999.0 999.0  999.0  999.0 999.0 999.0 -40.1    0.160 252.450 999.0 999.0  7139.5 99.0 99.0 99.0 99.0 99.0 99.0
  73.0  123.1 -72.5 999.0 999.0   -4.2   -4.6   6.2  42.2 -41.0    0.160 252.450 999.0 999.0  7212.0 99.0 99.0 99.0 99.0 99.0 99.0
  72.8  122.9 -72.6 999.0 999.0   -4.1   -4.6   6.2  42.1 -41.0    0.160 234.420 999.0 999.0  7222.2 99.0 99.0 99.0 99.0 99.0 99.0
  71.0  121.4 -73.3 999.0 999.0   -3.9   -4.6   6.0  40.2 -40.5    0.150 234.420 999.0 999.0  7292.8 99.0 99.0 99.0 99.0 99.0 99.0
  70.8  121.2 -73.4 999.0 999.0   -3.8   -4.6   5.9  39.7 -40.4    0.150 234.420 999.0 999.0  7302.7 99.0 99.0 99.0 99.0 99.0 99.0
  69.0  119.7 -73.9 999.0 999.0   -3.2   -4.6   5.5  34.7 -40.7    0.150 234.420 999.0 999.0  7373.0 99.0 99.0 99.0 99.0 99.0 99.0
  68.8  119.5 -74.0 999.0 999.0   -3.0   -4.5   5.5  33.7 -40.7    0.150 234.420 999.0 999.0  7383.2 99.0 99.0 99.0 99.0 99.0 99.0
  67.0  118.0 -74.3 999.0 999.0  999.0  999.0 999.0 999.0 -41.0    0.150 234.420 999.0 999.0  7455.5 99.0 99.0 99.0 99.0 99.0 99.0
  66.8  117.8 -74.3 999.0 999.0  999.0  999.0 999.0 999.0 -41.0    0.150 234.420 999.0 999.0  7465.9 99.0 99.0 99.0 99.0 99.0 99.0
  65.8  117.0 -74.5 999.0 999.0   -1.2   -4.4   4.5  15.5 -41.2    0.150 234.420 999.0 999.0  7507.0 99.0 99.0 99.0 99.0 99.0 99.0
  64.0  115.6 -74.9 999.0 999.0  999.0  999.0 999.0 999.0 -42.3    0.150 214.430 999.0 999.0  7579.1 99.0 99.0 99.0 99.0 99.0 99.0
  63.8  115.4 -75.0 999.0 999.0    0.2   -4.4   4.4 357.3 -42.5    0.130 214.430 999.0 999.0  7589.5 99.0 99.0 99.0 99.0 99.0 99.0
  62.0  113.9 -75.6 999.0 999.0  999.0  999.0 999.0 999.0 -43.9    0.130 214.430 999.0 999.0  7664.4 99.0 99.0 99.0 99.0 99.0 99.0
  61.8  113.7 -75.7 999.0 999.0  999.0  999.0 999.0 999.0 -44.1    0.130 214.430 999.0 999.0  7675.6 99.0 99.0 99.0 99.0 99.0 99.0
  60.8  112.8 -76.2 999.0 999.0  999.0  999.0 999.0 999.0 -44.4    0.130 214.430 999.0 999.0  7721.3 99.0 99.0 99.0 99.0 99.0 99.0
  59.8  111.9 -76.7 999.0 999.0    2.5   -3.9   4.6 326.9 -43.8    0.130 214.430 999.0 999.0  7766.6 99.0 99.0 99.0 99.0 99.0 99.0
  58.8  111.0 -77.0 999.0 999.0    2.8   -3.1   4.2 318.3 -42.5    0.130 214.430 999.0 999.0  7809.6 99.0 99.0 99.0 99.0 99.0 99.0
  57.8  110.2 -77.2 999.0 999.0  999.0  999.0 999.0 999.0 -41.4    0.130 214.430 999.0 999.0  7850.6 99.0 99.0 99.0 99.0 99.0 99.0
  56.0  108.9 -77.6 999.0 999.0    2.9   -0.1   2.9 272.3 -39.7    0.130 192.580 999.0 999.0  7921.5 99.0 99.0 99.0 99.0 99.0 99.0
  55.8  108.7 -77.7 999.0 999.0    2.9    0.2   2.9 266.7 -39.6    0.110 192.580 999.0 999.0  7931.5 99.0 99.0 99.0 99.0 99.0 99.0
  54.8  107.9 -78.0 999.0 999.0  999.0  999.0 999.0 999.0 -39.6    0.110 192.580 999.0 999.0  7971.2 99.0 99.0 99.0 99.0 99.0 99.0
  53.0  106.7 -78.9 999.0 999.0  999.0  999.0 999.0 999.0 -41.3    0.110 192.580 999.0 999.0  8038.7 99.0 99.0 99.0 99.0 99.0 99.0
  52.0  105.9 -79.4 999.0 999.0  999.0  999.0 999.0 999.0 -43.4    0.110 192.580 999.0 999.0  8080.4 99.0 99.0 99.0 99.0 99.0 99.0
  51.0  105.0 -79.8 999.0 999.0  999.0  999.0 999.0 999.0 -45.2    0.110 192.580 999.0 999.0  8126.7 99.0 99.0 99.0 99.0 99.0 99.0
  50.3  104.4 999.0 999.0 999.0  999.0  999.0 999.0 999.0 -45.8    0.110 192.580 999.0 999.0  8162.8 99.0 99.0 99.0 99.0 99.0 99.0
  49.8  103.9 -80.0 999.0 999.0  999.0  999.0 999.0 999.0 -45.8    0.110 192.580 999.0 999.0  8186.7 99.0 99.0 99.0 99.0 99.0 99.0
  48.0  102.5 -79.6 999.0 999.0  999.0  999.0 999.0 999.0 -45.3    0.110 168.950 999.0 999.0  8265.5 99.0 99.0 99.0 99.0 99.0 99.0
  47.8  102.3 -79.5 999.0 999.0  999.0  999.0 999.0 999.0 -45.3    0.100 168.950 999.0 999.0  8276.4 99.0 99.0 99.0 99.0 99.0 99.0
  46.0  100.9 -78.4 999.0 999.0   -3.7    4.1   5.6 138.1 -45.6    0.100 168.950 999.0 999.0  8353.7 99.0 99.0 99.0 99.0 99.0 99.0
  45.0  100.1 -77.6 999.0 999.0  999.0  999.0 999.0 999.0 -46.2    0.100 168.950 999.0 999.0  8399.7 99.0 99.0 99.0 99.0 99.0 99.0
  44.8   99.9 -77.4 999.0 999.0  999.0  999.0 999.0 999.0 -46.4    0.100 168.950 999.0 999.0  8411.4 99.0 99.0 99.0 99.0 99.0 99.0
  43.3   98.7 -76.5 999.0 999.0  999.0  999.0 999.0 999.0 -46.9    0.100 168.950 999.0 999.0  8483.4 99.0 99.0 99.0 99.0 99.0 99.0
  42.8   98.2 -76.3 999.0 999.0  999.0  999.0 999.0 999.0 -46.6    0.100 168.950 999.0 999.0  8507.3 99.0 99.0 99.0 99.0 99.0 99.0
  41.5   97.3 -75.9 999.0 999.0  999.0  999.0 999.0 999.0 -45.5    0.100 168.950 999.0 999.0  8564.9 99.0 99.0 99.0 99.0 99.0 99.0
  40.0   96.2 -75.7 999.0 999.0  999.0  999.0 999.0 999.0 -44.8    0.100 143.650 999.0 999.0  8630.7 99.0 99.0 99.0 99.0 99.0 99.0
  39.8   96.0 -75.7 999.0 999.0   -2.0    4.9   5.3 158.1 -44.8    0.080 143.650 999.0 999.0  8641.7 99.0 99.0 99.0 99.0 99.0 99.0
  38.0   94.7 -75.6 999.0 999.0   -1.4    4.3   4.5 162.2 -45.0    0.080 143.650 999.0 999.0  8720.6 99.0 99.0 99.0 99.0 99.0 99.0
  37.8   94.5 -75.6 999.0 999.0  999.0  999.0 999.0 999.0 -45.1    0.080 143.650 999.0 999.0  8732.0 99.0 99.0 99.0 99.0 99.0 99.0
  36.0   93.2 -75.6 999.0 999.0   -1.4    2.6   2.9 152.5 -45.8    0.080 143.650 999.0 999.0  8812.1 99.0 99.0 99.0 99.0 99.0 99.0
  35.8   93.0 -75.5 999.0 999.0  999.0  999.0 999.0 999.0 -46.0    0.080 143.650 999.0 999.0  8823.5 99.0 99.0 99.0 99.0 99.0 99.0
  34.0   91.7 -75.3 999.0 999.0  999.0  999.0 999.0 999.0 -47.5    0.080 143.650 999.0 999.0  8904.4 99.0 99.0 99.0 99.0 99.0 99.0
  33.8   91.5 -75.3 999.0 999.0   -1.3    0.7   1.5 116.2 -47.8    0.080 143.650 999.0 999.0  8916.1 99.0 99.0 99.0 99.0 99.0 99.0
  32.0   90.2 -75.0 999.0 999.0  999.0  999.0 999.0 999.0 -50.3    0.080 116.830 999.0 999.0  9001.5 99.0 99.0 99.0 99.0 99.0 99.0
  31.8   90.0 -74.9 999.0 999.0  999.0  999.0 999.0 999.0 -50.7    0.070 116.830 999.0 999.0  9014.3 99.0 99.0 99.0 99.0 99.0 99.0
  30.8   89.2 -74.7 999.0 999.0  999.0  999.0 999.0 999.0 -51.9    0.070 116.830 999.0 999.0  9066.8 99.0 99.0 99.0 99.0 99.0 99.0
  29.8   88.4 -74.5 999.0 999.0  999.0  999.0 999.0 999.0 -52.7    0.070 116.830 999.0 999.0  9119.8 99.0 99.0 99.0 99.0 99.0 99.0
  28.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.070 116.830 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  27.8 9999.0 999.0 999.0 999.0   -0.5   -1.5   1.5  17.4  99.0    0.070 116.830 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  26.0 9999.0 999.0 999.0 999.0   -0.8   -2.2   2.3  19.4  99.0    0.070 116.830 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  25.8 9999.0 999.0 999.0 999.0   -0.8   -2.2   2.4  20.1  99.0    0.070 116.830 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  24.8 9999.0 999.0 999.0 999.0   -1.0   -2.3   2.6  23.7  99.0    0.070  88.710 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  23.0 9999.0 999.0 999.0 999.0   -1.5   -2.2   2.6  34.2  99.0    0.050  88.710 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  22.0 9999.0 999.0 999.0 999.0   -1.8   -1.9   2.6  42.7  99.0    0.050  88.710 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  21.8 9999.0 999.0 999.0 999.0   -1.9   -1.9   2.7  44.9  99.0    0.050  88.710 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  20.3 9999.0 999.0 999.0 999.0   -2.5   -1.7   3.0  56.5  99.0    0.050  88.710 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  19.8 9999.0 999.0 999.0 999.0   -2.7   -1.7   3.2  58.8  99.0    0.050  88.710 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  18.8 9999.0 999.0 999.0 999.0   -3.2   -1.8   3.6  60.3  99.0    0.050  88.710 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  17.8 9999.0 999.0 999.0 999.0   -3.5   -2.1   4.1  58.4  99.0    0.050  88.710 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  16.0 9999.0 999.0 999.0 999.0   -3.8   -3.1   4.9  50.7  99.0    0.050  59.600 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  15.8 9999.0 999.0 999.0 999.0   -3.8   -3.3   5.1  49.4  99.0    0.040  59.600 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  14.0 9999.0 999.0 999.0 999.0   -3.9   -4.5   5.9  40.7  99.0    0.040  59.600 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  13.8 9999.0 999.0 999.0 999.0   -3.9   -4.7   6.1  39.6  99.0    0.040  59.600 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  12.0 9999.0 999.0 999.0 999.0   -3.7   -5.7   6.8  32.8  99.0    0.040  59.600 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  11.8 9999.0 999.0 999.0 999.0   -3.5   -5.8   6.8  30.8  99.0    0.040  59.600 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  10.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.040  59.600 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   9.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.040  59.600 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   8.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.040  29.910 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   7.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020  29.910 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   6.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020  29.910 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020  29.910 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020  29.910 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020  29.910 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020  29.910 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020  29.910 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.3 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020   0.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  -1.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0    0.020   0.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
